  2Helpfile: MXhf17X0
 
                        3g--- Locking Out Rooms ---0
 
  3b.EX0  -- Enter eXclude-Room
  3bX0    -- eXclude Room
 
    This room will be excluded from the default go-to rooms with unread
messages search.  You can still see the room in the Known rooms list, and
.Goto it explicitly.  To re-include a room, you must apply this command again
in the same room.
 
                        3g--- Status information ---0
 
  3b.RC0  -- Read Configuration
  3b.RS0  -- Read Status
 
    Read Configuration will display information on settings for your account
explicitly, such as terminal configuration, forwarding address, group
memberships, and default hall.  Read Status gives system-wide global
information, like the highest current message number, average message length,
how long the system has been running, and how long the current user has been
logged in.
 
                             3g--- Userlog ---0
 
  3b.RU0  -- Read Userlog
  3b.RVU0 -- Read Verbose Userlog
 
    These commands list all listed users of the system.  The verbose option
prints out the call number and the user's name, along with some other pieces
of information for Aides and Sysops.
 
                           3g--- Applications ---0
 
  3b.EA0  -- Enter Application
 
    This runs whatever application the room may have.
 
 
                         2-- Related Help Topics --0
 
 3cMXhf11X0
 3cMXhf12X0
 3cMXhf15X0
